HEC Feedthrough Spare Connectors

HEC Meeting 17/03/99 Michel Lefebvre University of Victoria

Number of feedthrough units per endcap^4 Number of spare feedthroughs^1

connector pigtail type connector pigtail type 15A LV 15B LV 14A LV 14B LV 13A LV 13B LV 12A T51 12B T51 11A T51 11B T51 10A T50 10B T50 9A T50 9B T50 8A T49 8B T49 7A T49 7B T49 6A T49 6B T49 5A T49 5B T49 4A T47 4B T47 3A T47 3B T47 2A T48 2B T48 1A T48 1B T48

pigtail type per feedthrough per endcap both endcaps spare feedthroughs T47 4 16 32 4 T48 4 16 32 4 T49 8 32 64 8 T50 4 16 32 4 T51 4 16 32 4 T52 0 0 0 0 LV 6 24 48 6 Total 30 120 240 30

HEC Feedthrough

Only 4/6 of these connectors are required

Which 4 connectors are used for LV? What do we do with the other 2?

needs updating

EMEC

Total of 8 HEC feedthroughs