1

2

180 GeV pions: normalized amplitude

Signals with amplitude greater than 30 ADC counts were used only

4

5

Time shifts of real particle signals w.r.t. their expected positions

7

8

Bad noise distributions

10

11

12

Electron energy distributions

Energy resolution for electrons

Energy resolution for electrons

16

17

18

Pion energy distributions

Energy resolution for pions

Energy resolution for pions

Spatial uniformity of response for pions

23