Electron Results:August 99 Beam Test

N.Javadov

Joint Institute for Nuclear Research, Dubna Institute of Physics, Baku

Electron Test Beam Analysis for points L and M 1. Note about Digital and Cubical data fit 2. Cluster Search 3. Rezults

LSEG1 LSEG2 LSEG3 LSEG4

1 * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * * *

2 * * * * X * * * * * * * * X * * X * * X * * X * * * * * * * * X * * X * * * * * * * * * *

3 * X * * X * * X * * X * * X * * X * X X X X X X * * * * X * X X X X X X * * * * X * * X *

4 * X * * X * X X X X X X X X X X X X X X X X X X * X * X X X X X X X X X * X * X X X X X X

5 X X X X X X

X X X X X X X X X X X X X X X

1. Use histogram’s data (hist.)

(mean, rms, maxval)

2. Use histogram Gause fitting data (fit.)

(mean, sigma, constant)

Cluster search use: 1 var. mean σ

2 var. mean � maxvalue σ

3 var. 1 σ

ELECTRONS, e, DIGITAL Point L

GeV run hist. hist. hist. fit. fit. fit. var. 1 var 2 var. 3 var 1 var. 2 var 3 10 9018 2111 2111 2111 2111 2111 2111 20 8980 2111 2111 2111 2111 2111 2111 40 8731 3211 2211 2211 2211 2211 2211 60 8710 4211 2211 2211 2211 2211 2211 80 8695 2211 2211 2211 2211 2211 2211 100 8649 4211 2211 2211 2211 2211 2211 120 8667 4211 2211 2211 2211 2211 2211 148 8609 4211 2211 2211 2211 2211 2211 193 9168 3211 2211 3211 3211 2211 2211

Point M

GeV run hist. hist. hist. fit. fit. fit. var. 1 var 2 var. 3 var 1 var. 2 var 3 10 9014 2111 2111 2111 2111 2111 2111 20 9034 3111 2111 2111 2111 2111 2111 40 8722 3211 2211 2211 2211 2211 2211 60 8711 3211 3211 3211 2211 2211 2211 80 8693 2211 2211 2211 2211 2211 2211 120 8629 3212 2211 3212 2211 2211 2211 148 8611 4211 2211 3211 2211 2211 2211 193 9172 3211 2211 2212 2211 2211 2211

ELECTRONS, e, CUBICAL Point L

GeV run hist. hist. hist. fit. fit. fit. var. 1 var 2 var. 3 var 1 var. 2 var 3 10 9018 2111 2111 2111 2111 2111 2111 20 8980 2111 2111 2111 2111 2111 2111 40 8731 2211 2211 2211 2211 2211 2211 60 8710 2211 2211 2211 2211 2211 2211 80 8695 2211 2211 2211 2211 2211 2211 100 8649 5211 2211 3211 2211 2211 2211 120 8667 3211 3211 3211 2211 2211 2211 148 8609 4211 3211 3211 3211 2211 2211 193 9168 3211 2211 2211 2211 2211 2211

Point M

GeV run hist. hist. hist. fit. fit. fit. var. 1 var 2 var. 3 var 1 var. 2 var 3 10 9014 2111 2111 2111 2111 2111 2111 20 9034 2111 2111 2111 2111 2111 2111 40 8722 2211 2211 2211 2211 2211 2211 60 8711 3211 2211 2211 2211 2211 2211 80 8693 3211 3211 2211 2211 2211 2211 120 8629 4212 2211 3311 3211 2211 2211 148 8611 4211 3211 4211 2211 2211 2211 193 9172 4312 2211 2211 3211 2211 2211