Status of the Monte Carlo Code for Simulations of EMEC/HEC Combined Tests

A. Kiryunin and D. Salihagić

July 09, 2001

ffl Geant3 based code ffl Simulation framework — Atlsim ffl Description:

– EMEC module (from C. Benchouk and A. Chekhtman) – HEC modules – “leakage detectors” – cryostat – H6 beam line elements (MWPCs, scintillator counters) ffl Output: Column-Wise Ntuples

ffl Still missing / to be done:

– digitization of EMEC (!!!)

– numbering scheme of ADC channels – exact position of modules wrt beam – fix output format

Energy Scan with Charged Pions