MPI070,HV

-0.1

-0.05 0 0.05 0.1

100 200 300 400 tube dy (mm)

MPI (open circles) LMU (full circles)

-0.1

-0.05 0 0.05 0.1

100 200 300 400 tube dz (mm)

MPI (open circles) LMU (full circles)

MPI070,HV

-0.1

0.1 layer 6

-0.1

0.1 layer 5

-0.1

0.1 layer 4

-0.1

0.1 layer 3

-0.1

0.1 layer 2 dy (mm)

-0.1

0.1 layer 1

MPI070,RO

-0.1

-0.05 0 0.05 0.1

100 200 300 400 tube dy (mm)

MPI (open circles) LMU (full circles)

-0.1

-0.05 0 0.05 0.1

100 200 300 400 tube dz (mm)

MPI (open circles) LMU (full circles)

MPI070,HV

-0.1

0.1 layer 6

-0.1

0.1 layer 5

-0.1

0.1 layer 4

-0.1

0.1 layer 3

-0.1

0.1 layer 2 dy (mm)

-0.1

0.1 layer 1

MPI070,MPI-LMU

-0.1

-0.05 0 0.05 0.1

100 200 300 400 tube

Dy (mm)

RO (open squares) HV (full squares)

-0.1

-0.05 0 0.05 0.1

100 200 300 400 tube

Dz (mm)

RO (open squares) HV (full squares)

MPI070,y-deviations

0 5 10 15 20

-0.1 0 0.1

Entries Mean RMS 246 -0.1388E-03 0.2654E-01

LMU dy, HV 0

10

20

-0.1 0 0.1

Entries Mean RMS 246 -0.7347E-04 0.2338E-01

LMU dy, RO

0 5 10 15 20

-0.1 0 0.1

Entries Mean RMS 246 -0.8139E-02 0.3026E-01

Dy (MPI-LMU), HV 0

10

20

30

-0.1 0 0.1

Entries Mean RMS 246 -0.9722E-02 0.2536E-01

Dy (MPI-LMU), RO

MPI070,z-deviations

0 10 20 30 40

-0.1 0 0.1

Entries Mean RMS 288 0.1389E-04 0.1335E-01

LMU dz, HV 0

20

40

-0.1 0 0.1

Entries Mean RMS 288 0.9723E-04 0.1245E-01

LMU dz, RO

0

10

20

30

-0.1 0 0.1

Entries Mean RMS 288 0.4167E-04 0.1798E-01

Dz (MPI-LMU), HV 0 10 20 30 40

-0.1 0 0.1

Entries Mean RMS 288 -0.1389E-03 0.1435E-01

Dz (MPI-LMU), RO