MPI087,HV

-0.1

-0.05 0 0.05 0.1

100 200 300 400 tube dy (mm)

MPI (open circles) LMU (full circles)

-0.1

-0.05 0 0.05 0.1

100 200 300 400 tube dz (mm)

MPI (open circles) LMU (full circles)

MPI087,HV

-0.1

0.1 layer 6

-0.1

0.1 layer 5

-0.1

0.1 layer 4

-0.1

0.1 layer 3

-0.1

0.1 layer 2 dy (mm)

-0.1

0.1 layer 1

MPI087,RO

-0.1

-0.05 0 0.05 0.1

100 200 300 400 tube dy (mm)

MPI (open circles) LMU (full circles)

-0.1

-0.05 0 0.05 0.1

100 200 300 400 tube dz (mm)

MPI (open circles) LMU (full circles)

MPI087,HV

-0.1

0.1 layer 6

-0.1

0.1 layer 5

-0.1

0.1 layer 4

-0.1

0.1 layer 3

-0.1

0.1 layer 2 dy (mm)

-0.1

0.1 layer 1

MPI087,MPI-LMU

-0.1

-0.05 0 0.05 0.1

100 200 300 400 tube

Dy (mm)

RO (open squares) HV (full squares)

-0.1

-0.05 0 0.05 0.1

100 200 300 400 tube

Dz (mm)

RO (open squares) HV (full squares)

MPI087,y-deviations

0

10

20

30

-0.1 0 0.1

Entries Mean RMS 246 0.1431E-02 0.1896E-01

LMU dy, HV 0 5 10 15 20

-0.1 0 0.1

Entries Mean RMS 246 -0.1463E-03 0.2343E-01

LMU dy, RO

0

10

20

30

-0.1 0 0.1

Entries Mean RMS 246 0.1187E-02 0.1944E-01

Dy (MPI-LMU), HV 0

10

20

-0.1 0 0.1

Entries Mean RMS 246 0.2683E-02 0.2119E-01

Dy (MPI-LMU), RO

MPI087,z-deviations

0 20 40 60

-0.1 0 0.1

Entries Mean RMS 342 0.3509E-04 0.1191E-01

LMU dz, HV 0 10 20 30 40

-0.1 0 0.1

Entries Mean RMS 342 -0.4678E-04 0.1516E-01

LMU dz, RO

0 10 20 30 40

-0.1 0 0.1

Entries Mean RMS 342 -0.1251E-02 0.1863E-01

Dz (MPI-LMU), HV 0 10 20 30 40

-0.1 0 0.1

Entries Mean RMS 342 -0.2281E-02 0.1552E-01

Dz (MPI-LMU), RO