% -*- coding:utf8 -*-
% vi:encoding=utf8:
% !TEX encoding = UTF-8 Unicode
%
% This file should be utf8 encoded so that these characters render as
% umlauts: ÄÖÜäöüß
%

\subsection{Bibiliographie}

\begin{Biblio}



\bibitem{at_det_paper}
    ATLAS collaboration,  
    \textsl{The ATLAS Experiment at the CERN Large Hadron Collider}, J.Inst.\ 3 (2008) S08003.

\bibitem{MuonTDR}
    ATLAS collaboration,
    \textsl{Technical Design Report for the Phase-2 Upgrade of the ATLAS Muon Spectrometer},
    CERN/LHCC-2017-017, December 2017.

%------- sMDT -------

\bibitem{BMG}
    C.~Ferretti and H.~Kroha (on behalf of the ATLAS collaboration),
    \textsl{Upgrades of the ATLAS Muon Spectrometer With sMDT Chambers},
    proc. $13^{\mathrm th}$ Pisa Meeting on Advanced Detectors, La Biodola, Italy, 24-30 May 2015, 
    MPP-2015-136, June 2015, Nucl.~Instr.~and Meth.\ {\bf A 824} (2016) 538.

\bibitem{BMG_BIS78}
    H.~Kroha et al.,
    \textsl{Upgrades of the ATLAS Muon Spectrometer with New Small-Diameter Drift Tube Chambers},
    proc. $14^{\mathrm th}$ Pisa Meeting on Advanced Detectors, La Biodola, Isola d'Elba, Italy, 27 May-2 June 2018,
    MPP-2018-153, July 2018, Nucl.~Instr.~and Meth.\ {\bf A936} (2019) 509.

\bibitem{BIS78_1}
    H.~Kroha (on behalf of the ATLAS collaboration),
    \textsl{Design and Construction of Integrated Small-Diameter Drift Tube and Thin-Gap Resistive Plate Chambers
    for the Phase-1 Upgrade of the ATLAS Muon Spectrometer},
    proc. $14^{\mathrm th}$ Pisa Meeting on Advanced Detectors, La Biodola, Isola d'Elba, Italy, 27 May-2 June 2018,
    MPP-2018-157, July 2018, Nucl.~Instr.~and Meth.\ {\bf A936} (2019) 445.
     
\bibitem{BIS78_2}    
    P.~Rieck, O.~Kortner, H.~Kroha (on behalf of the ATLAS collaboration),
    \textsl{Design, Construction and Test of Small-Diameter Drift Tube Chambers for the Phase-1 Upgrade of the ATLAS Muon Spectrometer},
    proc. $15^{\mathrm th}$ Vienna Conference on Instrumentation, Vienna, Austria, 15-19 February 2019, 
    MPP-2019-074, March 2019, Nucl.~Instr.~and Meth.\ {\bf A958} (2020) 162791.   
    
\bibitem{BIS78_3} 
    G.~Eberwein et al. (on behalf of the ATLAS collaboration),
    \textsl{Commissioning and installation of the new small-diameter Muon Drift Tube (sMDT) detectors for the Phase-I upgrade of the ATLAS Muon Spectrometer},
    proc. 2021 IEEE NSS, 16-23 October 2021, MPP-2021-378, arXiv:2112.07026, November 2021.    
 
\bibitem{BIS78_4}
    G.~Aad et al., The ATLAS Collaboration,
    \textsl{\ The ATLAS Experiment at the CERN Large Hadron Collider: A Description of the Detector Configuration for Run3},
    to be published in JINST. 
    
\item{sMDT1}
    H.~Kroha et al.,
    \textsl{Performance of New High-Precision Muon Tracking Detectors for the ATLAS Experiment},
    proc. 2016 IEEE Nuclear Science Symposium, Strasbourg, France, 29 October-6 November 2016, 
    MPP-2016-375, arXiv:1701.08971, November 2016.

\bibitem{sMDT2}
    H.~Kroha et al.,
    \textsl{Construction and Test of New Precision Drift Tube Chambers for the ATLAS Muon Spectrometer},
    proc. $14^{\mathrm th}$ Vienna Conference on Instrumentation, Vienna, Austria, 15-19 February 2016,
    MPP-2016-059, March 2016, Nucl.~Instr.~and Meth.\ {\bf A 845} (2017) 244.

\bibitem{sMDT3}
    H.~Kroha, R.~Fakhroutdinov, A.~Kozhin,
    \textsl{New High-Precision Drift Tube Chambers for the ATLAS Muon Spectrometer},
    MPP-2017-095, May 2017, Journal of Instr.~12 (2017) C06007.
    
\bibitem{sMDT4}
    H.~Kroha et al.,
    \textsl{New High-Precision Drift Tube Chambers for the ATLAS Muon Spectrometer},
    MPP-2017-096, arXiv:1705.05656, May 2017. 
         
\bibitem{ASD6} 
    G.~Eberwein,
    \textsl{Performance of Fast Readout Electronics for Muon Drift Tube Detectors at High Background Rates at Future Colliders},
    Master's Thesis, Technical University M\unich, March 2021, MPP-2021-075, CERN-THESIS-2021-061, May 2021.

\bibitem{sMDT5} 
    G.~Eberwein et al.,
    \textsl{High-Precision Large-Area Muon Tracking and Triggering with Drift Tube Chambers at Future Colliders},
    proc. $16^{\mathrm th}$ Vienna Conference on Instrumentation, Vienna, Austria, 21-25 February 2022,
%    MPP-2022-xxx, April 2022,
%    arXiv:xxxx.yyyyy, 
    to be published in Nucl.~Instr.~Meth.~A.   
%  
\bibitem{sMDT6}
    D.~Cieri, G.~Eberwein, O.~Kortner, H.~Kroha, E.~Voevodina,
    \textsl{Rate capability of small-diameter Muon Drift Tube precision tracking chambers with new fast readout elctronics 
    for HL-LHC and Future Hadron Colliders},
    proc. $15^{\mathrm th}$ Pisa Meeting on Advanced Detectors, La Biodola, Isola d'Elba, Italy, 22-28 May 2022,
%    MPP-2022-xxx, June 2022,
%    arXiv:xxxx, 
    to be published in Nucl.~Instr.~and Meth.~A. 
    
\bibitem{FCC1}
    Ph.~Gadow, O.~Kortner, H.~Kroha, R.~Richter,
    \textsl{Precision Muon Tracking Detectors for High-Energy Hadron Colliders},    
    proc. $14^{\mathrm th}$ Vienna Conference on Instrumentation, Vienna, Austria,15-19 February 2016,
    MPP-2016-060, March 2016, Nucl.~Instr.~and Meth.\ {\bf A 845} (2017) 246.
   
\bibitem{FCC2}
    O.~Kortner et al.,
    \textsl{Design of the FCC-hh Muon Detector and Trigger System},
    proc. $14^{\mathrm th}$ Pisa Meeting on Advanced Detectors, La Biodola, Isola d'Elba, Italy, 27 May-2 June 2018,
    MPP-2018-155, July 2018, Nucl.~Instr.~and Meth.\ {\bf A936} (2019) 447.

\bibitem{Kevin2022}
    K.~Nelson (on behalf of the ATLAS collaboration},  
    \textsl{Construction and performance of the sMDT chambers for the ATLAS muon detector upgrade for the HL-LHC},
    proc. $15^{\mathrm th}$ Pisa Meeting on Advanced Detectors, La Biodola, Isola d'Elba, Italy, 22-28 May 2022,
    MPP-2018-155, July 2018, Nucl.~Instr.~and Meth.\ {\bf A936} (2019) 447.
    
    
%---- RPC -----       

\bibitem{RPCgasgaps1}
    O.~Kortner, H.~Kroha, D.~Soyk, T.~Turkovic,
    \textsl{Industrialization of the Production of Thin-Gap Resistive Plate Chambers},
    proc. 16$^{th}$ Vienna Conference on Instrumentation, Vienna, Austria, 21-25 February 2022,
%    MPP-2022-xxx, June 2022,
%    arXiv:xxxx, 
    to be published in Nucl.~Instr.~and Meth.~A.
    

\bibitem{RPCgasgaps2}
    O.~Kortner, H.~Kroha, D.~Soyk, T.~Turkovic,
    \textsl{Qualification of New Companies for the Production of Resistive Plate Chambers},
    proc. $15^{\mathrm th}$ Pisa Meeting on Advanced Detectors, La Biodola, Isola d'Elba, Italy, 22-28 May 2022,
%    MPP-2022-xxx, June 2022,
%    arXiv:xxxx, 
    to be published in Nucl.~Instr.~and Meth.~A.
    
  
%---- Design Reports -----    

\bibitem{TDAQTDR}
    ATLAS collaboration, G.~Aad et al.,
    \textsl{Technical Design Report for the Phase-2 Upgrade of the ATLAS Trigger and Data Aquisition System},
    CERN/LHCC-2017-020, June 2018.

\bibitem{FCChhCDR}
    FCC Collaboration, A.~Abada et al.,
    \textsl{Future Circular Collider Study. Volume 3: The Hadron Collider (FCC-hh)-Conceptual Design Report},
    CERN-ACC-2018-0058, December 2018,
    Eur.~Phys.J.~Special Topics 228 (2019) 755.    

    
%-------- MDT trigger ------------------    

\bibitem{MDTtrigger1}
    O.~Kortner et al.,
    \textsl{Development of a Highly Selective First-Level Muon Trigger for ATLAS at HL-LHC Exploiting Precision Muon Drift-Tube Data},
    proc. 2016 IEEE Nuclear Science Symposium, Strasbourg, France, 29 October-6 November 2016, 
    MPP-2016-376, arXiv:1701.09150, November 2016.

\bibitem{MDTtrigger2}
    S.~Abovyan et al.,
    \textsl{Hardware Implementation of a Fast Algorithm  for the Reconstruction of Muon Tracks in ATLAS Muon Drift-Tube Chambers
    for the First-Level Muon Trigger at the HL-LHC},
    proc. 2017 IEEE Nuclear Science Symposium, Atlanta, Georgia, USA, 21-28 October 2017,
    MPP-2017-275, arXiv:1803.05468, November 2017.
    
\bibitem{MDTtrigger3}
    S.~Abovyan et al.,
    \textsl{First-Level Muon track Trigger for Future Hadron Collider Experiments},
    proc. $14^{\mathrm th}$ Pisa Meeting on Advanced Detectors, La Biodola, Isola d'Elba, Italy, 27 May-2 June 2018,
    MPP-2018-156, July 2018, Nucl.~Instr.~and Meth.\ {\bf A9367} (2016) 321.
        
\bibitem{MDTtrigger4}
    D.~Cieri et al., 
    \textsl{Hardware Demonstrator of a Compact First-Level Muon Track Trigger for Future Hadron Collider Experiments},
    MPP-2019-31, arXiv:1902.04122, February 2019, 
    Journal of Instr.~14 (2019) P02027.

\bibitem{MDTtrigger5}
    D.~Cieri et al. (on behalf of the ATLAS collaboration),
    \textsl{Hardware Demonstrator of the Phase-II ATLAS MDT Trigger Processo},
    proc. TWEPP 2019, Santiago de Compostela, Spain, 02-06 September 2019. 
    MPP-2019-372, PoS (TWEPP2019) 141, October 2019. 
    
\bibitem{MDTtrigger8}
    R.~Richter (on behalf of the ATLAS collaboration),
    \textsl{Upgrade of the ATLAS MDT Readout and Trigger for the HL-LHC},
    proc. TWEPP 2019, Santiago de Compostela, Spain, 02-06 September 2019. 
    MPP-2019-378, PoS (TWEPP2019) (2020) 146, October 2019. 
    
\bibitem{MDTtrigger6}
    D.~Cieri et al. (on behalf of the ATLAS collaboration),
    \textsl{Hardware Demonstrator of the MDT Trigger Processor for the ATLAS First-Level Muon Trigger at the HL-LHC},
    proc. 2021 IEEE NSS, 16-23 October 2021,
%    MPP-2022-xxx, 
%    arXiv:xxxx.yyyyy, 
%    April 2022.
    
\bibitem{MDTtrigger7}
    D.~Cieri (on behalf of the ATLAS collaboration),
    \textsl{Upgrade of the first-level muon trigger for the ATLAS experiment at the HL-LHC},
    proc. 15$^{th}$ Pisa Meeting on Advanced Detectors, La Biodola, Isola d'Elba, Italy, 22-28 May 2022,
    MPP-2022-075, 
%    arXiv:xxxx.yyyyy, 
    June 2022.
    
    
% ------- Electronics -------    
    
\bibitem{ASD1}
    M.~De Matteis et al.,
    \textsl{An Eight-Channel 0.13 $\mu$m CMOS Front-End for the ATLAS Muon Drift Tube Detectors},
    MPP-2015-476, June 2015,
    IEEE Sensors Journal, Vol.~17, No.~11 (2017) 3406.

\bibitem{ASD2}
    M.~Fras et al.,
    \textsl{An 8-Channel ASD in 130~nm CMOS for ATLAS Muon Drift Tube Readout at the HL-LHC},
    proc. TWEPP 2017, Santa Cruz, CA, USA, 11-14 September 2017,
    PoS(TWEPP2017)004.

\bibitem{ASD3}
    H.~Kroha et al.,
    \textsl{The New Octal Amplifier-Shaper-Discriminator Chip for the ATLAS MDT Chambers at HL-LHC},
    proc. $14^{\mathrm th}$ Pisa Meeting on Advanced Detectors, La Biodola, Isola d'Elba, Italy, 27 May-2 June 2018,
    MPP-2018-154, July 2018, Nucl.~Instr.~and Meth.~{\bf A936} (2019) 374.

\bibitem{BLR1}
    A.~Pipino et al.,
    \textsl{A 28~nm Fast Tracker Front-End for the ATLAS Phase-2 sMDT Detectors},
    proc. TWEPP 2018, Antwerp, Belgium, 17-21 September 2018,
    MPP-2018-358, PoS (TWEPP2018), October 2018.

\bibitem{BLR2} 
    K.~Schmidt-Sommerfeld,
    \textsl{Performance of Readout Electronics for Drift Tube Chambers at High Counting Rates},
    PhD thesis, Technical University Munich, MPP-2020-005, CERN-THESIS-2020-016, February 2020.

\bibitem{TDC1}
    A.~Pipino et al.,
    \txtsl{A 130~nm CMOS PLL for the ATLAS Phase-2 MDT TDC},
    proc. TWEPP 2018, Antwerp, Belgium, 17-21 September 2018,
    MPP-2018-359, October 2018.        

\bibitem{ASD4}
    F.~Resta et al., 
    \textsl{MDT ASD2v6 User's Manual}, 
    MPP-2019-046, March 2019.  
    
\bibitem{ASD5}
    S.~Abovyan et al.,
    \textsl{The New Octal Amplifier-Shaper-Discriminator Chip for the ATLAS MDT Chambers at HL-LHC},
    proc. $14^{\mathrm th}$ Pisa Meeting on Advanced Detectors, La Biodola, Isola d'Elba, Italy, 27 May--2 June 2018,
    MPP-2018-154, July 2018, Nucl.~Instr.~and Meth.\ {\bf A936} (2019) 374.

\bibitem{TDC2}
    Y.~Liang et al.,                                                        
    \txtsl{Design and performance of a TDC ASIC for the upgrade of the ATLAS Monitored Drift Tube detectors},                                                       
    arXiv:1903.06995, March 2019, to be published in Nucl.~Instr.~and Meth.~A.    
         
%\bibitem{ASD6} s.o.
%    G.~Eberwein,
%    \textsl{Performance of Fast Readout Electronics for Muon Drift Tube Detectors at High Background Rates at Future Colliders},
%    Master's Thesis, Technical University M\unich, March 2021, MPP-2021-075, CERN-THESIS-2021-061, May 2021.

\bibitem{ASD7} 
    S.~Abovyan et al.,
    \textsl{Performance of the Amplifier-Shaper-Discriminator ASICs produced for the ATLAS MDT Chambers at the HL-LHC},
    proc. 2021 IEEE NSS, 16-23 October 2021,
    MPP-2022-206, 
%    arXiv:xxxx.yyyyy, 
    April 2022.
    
\bibitem{ASD65nm} 
    S.A.A.~Shah et al.,
    A 4-Channel Ultra-Low Power Front-End Electronics in 65 nm CMOS for ATLAS MDT Detectors,
    MDPI Electronics {\bf 2022,} 11, 1001, accepted by JINST.

\bibitem{ASD8} 
    S.~Abovyan et al.,
    Certification of the amplifier-shaper-discriminator ASICs produced for the ATLAS MDT chambers at the HL-LHC,
    proc. TWEPP 2021, 20-24 September 2021, MPP-2021-205, PoS (TWEPP2021), May 2022.


\end{Biblio}