% -*- coding:utf-8 -*-
% vi:encoding=utf-8:
% !TEX encoding = UTF-8 Unicode
%
% This file should be utf8 encoded so that these characters render as
% umlauts: ÄÖÜäöüß
%

\section{Committees}


\begin{JBlist}{Cieri, D.}

ATLAS Muon Efficiency Measurement Coordinator.

ATLAS Trigger and Data Acquisition Firmware Coordinator.

Hog Software Group Coordinator

\end{JBlist}


\begin{JBlist}{Duda, D.}

Convenor of the ATLAS-Germany Higgs Boson Working Group.  

ATLAS B Tagging Calibration Coordinator. 

ATLAS Diboson Resonance, Multi-lepton and Extra Dimension Search Coordinator.

\end{JBlist}


\begin{JBlist}{Holzbock, M.}

ATLAS Missing Energy and Pile-up Tagging Coordinator.

\end{JBlist}


\begin{JBlist}{Junggeburth, J.}

ATLAS Muon Efficiency Measurement Coordinator.

\end{JBlist}


\begin{JBlist}{K\"ohler, N.}

ATLAS PhD and Springer PhD Awards 2019.

\end{JBlist}


\begin{JBlist}{Kortner, O.}

ATLAS MDT First-Level Trigger Upgrade Co-coordinator.

ATLAS MDT Readout Board Upgrade Coordinator.

Member of the organizing committee of the 7$^{th}$ Common ATLAS-CMS Electronics Workshop for LHC Upgrades ACES 2020. 

\end{JBlist}


\begin{JBlist}{Kortner, S.}                                                                                                

Principle Investigator of the Munich Cluster of Excellence ``Origin and Structure of the Universe''.

ATLAS Joint EFT and Interpretation Combination Coordinator.

LHC EFT Working Group Convenor.

Member of the organizing committee of the DESY Theory Workshop, 27--30 September 2022.

Organizer of the EFT session of the Higgs 2022 conference, Pisa, 7--11 November 2022.

\end{JBlist}


\begin{JBlist}{Kroha, H.}

Principle Investigator of the Munich Cluster of Excellence ``Origin and Structure of the Universe''.

ATLAS sMDT Chamber Upgrade Coordinator.

Member of the ATLAS Phase-2 Muon Upgrade Steering Group.

Member of the Institute Board of the ATLAS Muon Collaboration.

Member of the Institute Board of the CERN RD51 Collaboration.

Chair of the MPP Budget Commission

\end{JBlist}


\begin{JBlist}{Rendel, M.}                                                                                                

ATLAS sMDT Chamber Construction QA/QC Manager.

\end{JBlist}


\begin{JBlist}{Richter, R.}                                                                                                

ATLAS MDT readout ASIC Upgrade Co-coordinator.

\end{JBlist}

\begin{JBlist}{Rieck, P.}                                                                                                

ATLAS sMDT Chamber Construction QA/QC Manager.

Coordinator of the ATLAS s-Channel Mediator Dark Matter Analyses Combination.

ATLAS Jets plus Dark Matter Search Coordinator.

\end{JBlist}


\begin{JBlist}{Soyk, D.}                                                                                                

ATLAS RPC Mechanics Upgrade Project Engineer.

\end{JBlist}


\begin{JBlist}{Voevodina, E.}

Member of the ATLAS MDT chamber operation group.

\end{JBlist}

