0 200 400 600 800 1000 1200 1400 1600 1800 1

10

210

310 TDC counts in central region in ML1, Layer1

no shielding

0 200 400 600 800 1000 1200 1400 1600 1800 1

10

210

310 TDC counts in central region in ML2, Layer1

no shielding

0 200 400 600 800 1000 1200 1400 1600 1800 1

10

210

310 TDC counts in central region in ML1, Layer2

MDT-HV on, RPC-HV off MDT-HV on, RPC-HV on MDT-HV off, RPC-HV off MDT-HV off, RPC-HV on

0 200 400 600 800 1000 1200 1400 1600 1800 1

10

210

310 TDC counts in central region in ML2, Layer2

MDT-HV on, RPC-HV off MDT-HV on, RPC-HV on MDT-HV off, RPC-HV off MDT-HV off, RPC-HV on

0 200 400 600 800 1000 1200 1400 1600 1800 1

10

210

310 TDC counts in central region in ML1, Layer3

0 200 400 600 800 1000 1200 1400 1600 1800 1

10

210

310 TDC counts in central region in ML2, Layer3