afs.Wires_Coord_BOSXA_MPI_090_p1_r0_1731.html.Without corrections

-0.06

-0.04

-0.02

0

0.02

0.04

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.01

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p1_r0_1747.html.Without corrections

-0.05

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0.03

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.02

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p1_r0_1752.html.Without corrections

-0.05

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0.03

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.02

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p1_r0_1753.html.Without corrections

-0.05

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0.03

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.02

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p1_r0_1754.html.Without corrections

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0.03

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.02

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p1_r0_bs_1748.html.Without corrections

-0.05

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0.03

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.02

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p1_r1_bs_1695.html.Without corrections

-0.05

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0.03

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.02

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p2_r0_1729.html.Without corrections

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.02

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p2_r0_1744.html.Without corrections

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0.03

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.02

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p2_r0_1746.html.Without corrections

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0.03

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.02

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p2_r0_bs_1693.html.Without corrections

-0.05

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0.03

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.02

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p3_r0_1733.html.Without corrections

-0.03

-0.02

-0.01

0

0.01

0.02

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.03

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p3_r0_1742.html.Without corrections

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.03

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p3_r0_1743.html.Without corrections

-0.05

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0.03

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.03

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p4_r0_1712.html.Without corrections

-0.03

-0.02

-0.01

0

0.01

0.02

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.03

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p4_r0_1722.html.Without corrections

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.03

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p4_r0_1740.html.Without corrections

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0.03

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.03

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p4_r0_bs_1682.html.Without corrections

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.03

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p4_r0_bs_1687.html.Without corrections

-0.04

-0.03

-0.02

-0.01

0

0.01

0.02

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.03

Fluctuation of the wire vertical coordinates put in the same coord. system afs.Wires_Coord_BOSXA_MPI_090_p5_r0_1727.html.Without corrections

-0.03

-0.02

-0.01

0

0.01

0.02

0 250 500 750 1000 1250 1500 1750 2000

2003/06/24 11.03

Fluctuation of the wire vertical coordinates put in the same coord. system