gc086

0.84

0.86

0.88 0.9 0.92

0.94

0.96

0.98 1

0 200 400 600 800 1000 Time (hours)

Sensitivity loss

0.97

0.975

0.98

0.985

0.99

0.995 1 1.005

1.01

0 5 10 15 20 25 30 Time (hours)

Sensitivity loss