% --------------------------------------------------------------------
% ALMY Workshop 98 Vortrag
% Author: H. Kroha
% --------------------------------------------------------------------
%
%
%FORMAT latex % use LATEXE format
\documentstyle[dina4,epsfig,colordvi]{foils}
% ---------------------------------------------------------------------
\oddsidemargin  -10mm
\evensidemargin -10mm
\topmargin -10mm
%\headheight 12pt
%\headsep 25pt
%\footheight 12pt
%\footskip 75pt
\textheight 230mm
\textwidth 180mm

\parindent0.0em

\font\tenrm=cmr10

%\pagestyle{empty}

%\psdraft

\begin{document}
%
\MyLogo{H.~Kroha, MPI Munich\hspace{6.6cm}
ALMY Workshop, MPI Munich, 6-8 April 1998}
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Page1
%

\noindent
\begin{center}
\begin{LARGE}
\Blue{\bf Optical Properties of}
\Blue{\bf Transparent Silicon Sensors}
\end{LARGE}
\vspace{5mm}

\noindent
{\bf H.~Kroha}
\vspace{2mm}

\noindent
{\bf Max-Planck-Institut f\"ur Physik, Munich}
\end{center}
\vspace{45mm}

\begin{large}
\noindent
\Red{\bf Update on c-Si strip sensors.}
\end{large}

\vfill\eject
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Page2
%

\noindent
\begin{center}
\begin{LARGE}
\Blue{\bf Summary of Ageing Tests of}
\Blue{\bf Amorphous Silicon Sensors}
\end{LARGE}
\vspace{5mm}

\noindent
{\bf H.~Kroha}
\vspace{2mm}

\noindent
{\bf Max-Planck-Institut f\"ur Physik, Munich}
\end{center}

\vfill\eject
%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Page3
%

\noindent
\begin{center}
\begin{LARGE}
\Blue{\bf The Alignment System of the}
\Blue{\bf ATLAS Endcap Muon Spectrometer}
\end{LARGE}
\vspace{5mm}

\noindent
{\bf H.~Kroha}
\vspace{2mm}

\noindent
{\bf Max-Planck-Institut f\"ur Physik, Munich}
\end{center}

\vfill\eject
%%%%%%%%%%%%%%%%%%%%%%%%%%%
\end{document}
