gc08-III

0 0.025

0.05

0.075 0.1 x 10^{-5}

-5 -2.5 0 2.5 5

U(V)

J/S (A/cm^2)

dark

-0.4

-0.2 0 0.2 0.4 0.6 x 10^{-4}

-5 -2.5 0 2.5 5

U(V)

J/S (A/cm^2)

light gc08-III

10^{-8}

10^{-7}

-5 -2.5 0 2.5 5

U(V)

J/S (A/cm^2)

dark

10^{-6}

10^{-5}

-5 -2.5 0 2.5 5

U(V)

J/S (A/cm^2)

light

dark gc08-III

-0.1

-0.08

-0.06

-0.04

-0.02 x 10^{-6}

0 20 40 60

y-strip

J/S (A/cm^2)

dark, U=-2V

-0.1

-0.08

-0.06

-0.04 x 10^{-6}

0 20 40 60

x-strip

J/S (A/cm^2)

dark, U=-2V gc08-III

-0.4

-0.3

-0.2

-0.1 x 10^{-7}

0 20 40 60

y-strip

J/S (A/cm^2)

dark, U=-1V

-0.4

-0.35

-0.3

-0.25

-0.2 x 10^{-7}

0 20 40 60

x-strip

J/S (A/cm^2)

dark, U=-1V gc08-III

-0.2

-0.15

-0.1 x 10^{-4}

0 20 40 60

y-strip

J/S (A/cm^2)

light, U=-2V

-0.3

-0.25

-0.2

-0.15 x 10^{-4}

0 20 40 60

x-strip

J/S (A/cm^2)

light, U=-2V