gc10-VII

-0.5

0

0.5 x 10^{-6}

-5 -2.5 0 2.5 5

U(V)

J/S (A/cm^2)

dark

-0.4

-0.2 0 0.2 0.4 x 10^{-4}

-5 -2.5 0 2.5 5

U(V)

J/S (A/cm^2)

light gc10-VII

10^{-8}

10^{-7}

-5 -2.5 0 2.5 5

U(V)

J/S (A/cm^2)

dark

10^{-6}

10^{-5}

-5 -2.5 0 2.5 5

U(V)

J/S (A/cm^2)

light dark gc10-VII

-0.16

-0.14

-0.12

-0.1 x 10^{-6}

0 20 40 60

y-strip

J/S (A/cm^2)

dark, U=-2V

-0.14

-0.12

-0.1

-0.08 x 10^{-6}

0 20 40 60

x-strip

J/S (A/cm^2)

dark, U=-2V gc10-VII

-0.7

-0.6

-0.5

-0.4

-0.3 x 10^{-7}

0 20 40 60

y-strip

J/S (A/cm^2)

dark, U=-1V

-0.5

-0.4

-0.3

-0.2 x 10^{-7}

0 20 40 60

x-strip

J/S (A/cm^2)

dark, U=-1V gc10-VII

-0.3

-0.25

-0.2

-0.15

-0.1

-0.05 x 10^{-4}

0 20 40 60

y-strip

J/S (A/cm^2)

light, U=-2V

-0.4

-0.3

-0.2

-0.1 x 10^{-4}

0 20 40 60

x-strip

J/S (A/cm^2)

light, U=-2V