%---------------------------------------------------------------------
% Elba 2000 Poster
% Author: H. Kroha
%
% ALMY Laser Alignment System for Tracking Detectors
% Using Transparent Silicon Strip Sensors
% --------------------------------------------------------------------
%
%FORMAT latexe % use LATEXE format
\documentstyle[epsfig,colordvi,fancyheadings]{foils}
% ---------------------------------------------------------------------
\oddsidemargin -16mm
\evensidemargin -16mm
\topmargin -28mm
\headheight 12pt
\headsep 25pt
\footheight 12pt
\footskip 75pt
\textheight 255mm
\textwidth 185mm

\font\tenrm=cmr10
\parindent=0.0em


%\psdraft
\pagestyle{fancyplain}
 \headrulewidth 0pt
 \plainheadrulewidth 0pt
 \footrulewidth 2pt
 \plainfootrulewidth 2pt
\rhead[\fancyplain{}{}]{\fancyplain{}{}}
\lhead[\fancyplain{}{}]{\fancyplain{}{}}
\rfoot{}
\cfoot{}
\lfoot[\fancyplain{}{}]%
{\fancyplain{\tiny H.~Kroha, MPI Munich}%
{\tiny H.~Kroha, MPI Munich}}

\fboxrule=0.8mm
\fboxsep=3mm
\parindent=0.0em
\fboxrule=0.8mm

\begin{document}
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Page8
%
\begin{figure}

\begin{center}
\Blue{\fbox{\Large\bf ALMY System Test}}
\end{center}

\vspace{6mm}
\Blue{\bf Straightness and stability of laser beams tested}
\centerline{\Red{\bf in a setup with 10 sensors/beam over 15~m}}
\Blue{for the TESLA Free Electron Laser test facility at DESY:}

\vspace{-2mm}
\begin{center}
\mbox{\epsfig{figure=/.at/mdt_data/kroha/eps/fel_almy_test_02_1.eps,
width=0.88\textwidth}}
\end{center}

\vspace{-200mm}
\end{figure}                                                                                  

\clearpage
%%%%%%%%%%%%%%%%%%%%%%%%%%%
\end{document}
