’gc’097’ refraction before irradiation ’

-7118 0 7118

-7118 0 7118

-15 -10 -5 0

-7118 0 7118

-7118 0 7118

0 10

0

100

200

-40 0 40

Entries Mean RMS 2116 -6.916 3.697

0 50 100 150 200

-40 0 40

Entries Mean RMS 2116 4.605 4.563

’gc’097’ difference in refraction (before-after)’

-7118 0 7118

-7118 0 7118 -20 -10 0 10

-7118 0 7118

-7118 0 7118 -20 -10 0 10

0

50

100

150

-40 0 40

Entries Mean RMS 2116 0.6767 5.726

0

50

100

150

-40 0 40

Entries Mean RMS 2116 -4.340 5.006

-7118 0 7118

-7118 0 7118

0.72

0.74

0.76

0.78 0.8

0

200

400

0 1

Entries Mean RMS 2116 0.7521 0.2109E-01

transmision before irradiation

-7118 0 7118

-7118 0 7118

0 0.02

0.04

0.06

0

20

40

60

-0.04 0 0.04

Entries Mean RMS 2116 0.2193E-01 0.1094E-01

difference in transmision (before-after)