’gc’084’ refraction before irradiation ’

-7118 0 7118

-7118 0 7118

-40 -20 0 20

-7118 0 7118

-7118 0 7118

-20 0 20

0

500

1000

1500

-200 0 200

Entries Mean RMS 2116 -6.367 3.481

0 250 500 750 1000

-200 0 200

Entries Mean RMS 2116 -10.27 4.430

’gc’084’ difference in refraction (before-after)’

-7118 0 7118

-7118 0 7118

-10 0 10

-7118 0 7118

-7118 0 7118

-10 0 10 20

0

100

200

300

-40 0 40

Entries Mean RMS 2116 -0.9493 2.728

0 50 100 150 200

-40 0 40

Entries Mean RMS 2116 -0.7070 3.714

-7118 0 7118

-7118 0 7118

0.65 0.7 0.75

0

500

1000

0 1

Entries Mean RMS 2116 0.7432 0.1064E-01

transmision before irradiation

-7118 0 7118

-7118 0 7118

0.02

0.04

0.06

0.08

0 100 200 300 400

-0.04 0 0.04

Entries Mean RMS 2116 0.3094E-01 0.3946E-02

difference in transmision (before-after)

-7118 0 7118

-7118 0 7118

0.96

0.98 1 1.02

1.04

0

100

200

0.8 1 1.2

Entries Mean RMS 2116 0.9997 0.1592E-01

normalized sensitivity before irradiation

-7118 0 7118

-7118 0 7118 0 0.1 0.2 0.3

0 200 400 600 800

-0.2 0 0.2

Entries Mean RMS 2116 0.2005E-01 0.2456E-01

difference in sensitivity (before-after)