’gc’001’ refraction before irradiation ’

-7118 0 7118

-7118 0 7118

-150

-100 -50

-7118 0 7118

-7118 0 7118

-100 -75 -50 -25

0

50

100

150

-200 0 200

Entries Mean RMS 2116 -87.01 20.64

0 50 100 150 200

-200 0 200

Entries Mean RMS 2116 -40.35 16.14

’gc’001’ difference in refraction (before-after)’

-7118 0 7118

-7118 0 7118

-40 -20 0

-7118 0 7118

-7118 0 7118

-40 -20 0 20 40

0

100

200

-40 0 40

Entries Mean RMS 2116 -2.650 3.756

0

100

200

300

-40 0 40

Entries Mean RMS 2116 -4.466 3.312

-7118 0 7118

-7118 0 7118

0.5 0.6 0.7 0.8

0 250 500 750 1000

0 1

Entries Mean RMS 2116 0.8745 0.1772E-01

transmision before irradiation

-7118 0 7118

-7118 0 7118

-0.4

-0.2 0

0

50

100

150

-0.04 0 0.04

Entries Mean RMS 2116 -0.1576E-01 0.6339E-02

difference in transmision (before-after)

-7118 0 7118

-7118 0 7118

0.98 1 1.02

0

100

200

300

0.8 1 1.2

Entries Mean RMS 2116 1.001 0.1248E-01

normalized sensitivity before irradiation

-7118 0 7118

-7118 0 7118

0.01

0.02

0.03

0.04

0.05

0

200

400

600 800

-0.2 0 0.2

Entries Mean RMS 2116 0.2637E-01 0.6188E-02

difference in sensitivity (before-after)