% -*- coding:utf-8 -*-
% vi:encoding=utf-8:
% !TEX encoding = UTF-8 Unicode
%
% This file should be utf8 encoded so that these characters render as
% umlauts: ÄÖÜäöüß
%

%
% Main-ATLAS
% Stefans comment
%

\section{The ATLAS detector}
\subimport{./}{ATLAS-Introduction}

\section{Detector Operation and Calibration}
\subimport{Present/}{ATLAS-Present}

\section{ATLAS Physics Analysis}
\subimport{Analysis/}{ATLAS-Analysis}

\section{Detector Upgrade}
\subimport{Upgrade/}{ATLAS-Upgrade}

\subimport{./}{ATLAS-Bibli.tex}
