% -*- coding:utf-8 -*-
% vi:encoding=utf-8:
% !TEX encoding = UTF-8 Unicode
%
% This file should be utf8 encoded so that these characters render as
% umlauts: ÄÖÜäöüß
%
%----------------------------------------------------------- 
\bibitem{ATLAS_ATLASIDPerf}
G.~Aad {\it et al.}, The ATLAS Collaboration,
{\em The ATLAS Inner Detector commissioning and calibration},
accepted by Eur.~Phys.~J.~C70 (2010) 787-821.
%----------------------------------------------------------- 
\bibitem{ATLAS_SCT_Ahmad_1}
A.~Ahmad {\it et al.}, The ATLAS SCT Collaboration,
{\em The Silicon microstrip sensors of the ATLAS semiconductor tracker},
Nucl.~Instr.~and Meth.~A578 (2007) 98-118.
%----------------------------------------------------------- 
\bibitem{ATLAS_SCT_Abdesselam_1}
A.~Abdesselam {\it et al.}, The ATLAS SCT Collaboration,
{\em The ATLAS semiconductor tracker end-cap module},
 Nucl.~Instr.~and Meth.~A575 (2007) 353-389.
%----------------------------------------------------------- 
%------------------ Comissioning ---------------------------
%----------------------------------------------------------- 
