Fig. 1: Distributions of the residuals of the wire positions measured by the X-ray tomograph on the high voltage (HV) side (scan no. 20) with respect to the fitted wire grid.

Fig. 2: Distributions of the residuals of the wire positions measured by the X-ray tomograph on the high voltage (RO) side (scan no. 13) with respect to the fitted wire grid.