1.ML BOS TUBES (MPI)

0 5 10 15 20 25 30 35 40 45

-40 -20 0 20 40

29.23 / 19 Constant 40.38 Mean -6.806 Sigma 8.131

z (μm)

Entries,Side A

0 5 10 15 20 25 30 35 40 45

-40 -20 0 20 40

8.519 / 14 Constant 42.51 Mean -6.183 Sigma 8.755

z (μm)

Entries,Side B

0 5 10 15 20 25 30 35

-40 -20 0 20 40

23.47 / 16 Constant 30.10 Mean 11.17 Sigma 11.02

y (μm)

Entries,Side A

0 5 10 15 20 25 30 35 40

-40 -20 0 20 40

20.23 / 15 Constant 34.22 Mean -5.166 Sigma 10.28

y (μm)

Entries,Side B