2.ML BOS TUBES (MPI)

0 5 10 15 20 25 30 35 40

-40 -20 0 20 40

24.28 / 20 Constant 31.27 Mean -6.969 Sigma 12.77

z (μm)

Entries,Side A

0 5 10 15 20 25 30 35 40 45

-40 -20 0 20 40

17.56 / 19 Constant 36.05 Mean -0.9689 Sigma 11.23

z (μm)

Entries,Side B

0 5 10 15 20 25 30 35

-20 0 20 40 60 80

44.80 / 20 Constant 26.11 Mean 37.31 Sigma 13.66

y (μm)

Entries,Side A

0 5 10 15 20 25 30 35

-40 -20 0 20 40

32.13 / 19 Constant 29.98 Mean -2.645 Sigma 12.97

y (μm)

Entries,Side B