BOS-0 Sag

-1 -0.9

-0.8

-0.7

-0.6

0 2 4 6 8

INITIAL ORIENTATION LB1 LB2 average

-1 -0.8

-0.6

0 2 4 6 8

INVERTED ORIENTATION LB1 LB2 average