0 5 10 15 20 25 30 35 40

-20 0 20

Entries 421 55.99 / 38 Constant 21.23 Mean -3.389 Sigma 6.888

side a (x) μm

Entries

0 5 10 15 20 25

-20 0 20

Entries 419 28.87 / 35 Constant 21.50 Mean -2.761 Sigma 7.324

side b (x) μm

Entries

0 2.5 5 7.5 10 12.5 15 17.5 20 22.5

-20 0 20

Entries 421 45.08 / 35 Constant 16.43 Mean -4.764 Sigma 9.644

side a (y) μm

Entries

0 5 10 15 20 25

-20 0 20

Entries 419 33.39 / 36 Constant 19.08 Mean -5.480 Sigma 8.257

side b (y) μm

Entries

-30

-20

-10

0

10

20

30

-30 -20 -10 0 10 20 30 x μm y μm

-30

-20

-10

0

10

20

30

40

-30 -20 -10 0 10 20 30 40 x-LMU μm x-Dubna μm

-30

-20

-10

0

10

20

30

40

-30 -20 -10 0 10 20 30 40 y-LMU μm y-Dubna μm

0 20 40 60 80 100 120 140 160

-20 -15 -10 -5 0 5 10 15 20

Entries 840 14.53 / 14 Constant 145.0 Mean -5.980 Sigma 4.499

LMU - Dubna x μm

Entries

0 20 40 60 80 100 120 140 160 180

-20 -15 -10 -5 0 5 10 15 20

Entries 840 32.81 / 14 Constant 155.2 Mean -5.621 Sigma 4.057

LMU - Dubna μm

Entries

0 20 40 60 80 100

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries 840 25.47 / 22 Constant 99.23 Mean 0.6228E-02 Sigma 1.638

Reproducablty μm

Entries

0 20 40 60 80 100

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries 840 18.63 / 22 Constant 101.8 Mean -0.3315E-01 Sigma 1.611

Reproduceblty μm

Entries

0 5 10 15 20 25 30

300 310 320 330 340 350 360 370 380

Entries 415 70.62 / 36 Constant 24.89 Mean 322.8 Sigma 5.518

wire tension (LMU) in g

Entries

0 10 20 30 40 50

-20 -15 -10 -5 0 5 10 15 20

Entries 400 59.79 / 22 Constant 42.74 Mean 3.512 Sigma 3.169

wire tension LMU - wire tension Dubna in g

Entries

300 310 320

330 340 350 360 370 380

300 310 320 330 340 350 360 370 380 wire tension LMU in g wire tension Dubna in g