0 5 10 15 20 25 30

300 310 320 330 340 350 360 370 380

Entries 415 70.62 / 36 Constant 24.89 Mean 322.8 Sigma 5.518

wire tension (LMU) in g

Entries

0 10 20 30 40 50

-20 -15 -10 -5 0 5 10 15 20

Entries 400 59.79 / 22 Constant 42.74 Mean 3.512 Sigma 3.169

wire tension LMU - wire tension Dubna in g

Entries