0 5 10 15 20 25 30 35 40

-20 0 20

Entries 421 55.99 / 38 Constant 21.23 Mean -3.389 Sigma 6.888

side a (x) μm

Entries

0 5 10 15 20 25

-20 0 20

Entries 419 28.87 / 35 Constant 21.50 Mean -2.761 Sigma 7.324

side b (x) μm

Entries

0 2.5 5 7.5 10 12.5 15 17.5 20 22.5

-20 0 20

Entries 421 45.08 / 35 Constant 16.43 Mean -4.764 Sigma 9.644

side a (y) μm

Entries

0 5 10 15 20 25

-20 0 20

Entries 419 33.39 / 36 Constant 19.08 Mean -5.480 Sigma 8.257

side b (y) μm

Entries