0 20 40 60 80 100

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries 840 25.47 / 22 Constant 99.23 Mean 0.6228E-02 Sigma 1.638

Reproducablty μm

Entries

0 20 40 60 80 100

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries 840 18.63 / 22 Constant 101.8 Mean -0.3315E-01 Sigma 1.611

Reproduceblty μm

Entries