mdt_t1_15_hist Entries 26064 Mean 76.97 RMS 57.92

t [ns]

-100 0 100 200 300 400 500 600 700

Counts

0 50 100 150 200 250 300 350_{mdt_t1_15_hist}

0

MDT 15 mm

MDT 30 mm

Garfield 15 mm