Entries 8914 / ndf

2χ 236.2 / 128 Constant 4.0±

278.1 Mean 0.00178 ± 0.01255 Sigma 0.0015 ± 0.1612

|/2 [mm] up +d low -|d small r -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0 50 100 150 200 250 300_{Entries 8914}

± ±