Entries 9030 / ndf

2χ 344.7 / 100 Constant 6.1±

401.1 Mean 0.00124 ± 0.01539 Sigma 0.0012 ± 0.1152

)/2 [mm] up-d low (d -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0

100

200

300

400

500

± ±