\providecommand{\href}[2]{#2}\begingroup\raggedright\begin{thebibliography}{1}

\bibitem{atlas:2005}
{ATLAS} Collaboration,, Journal of Instrumentation {\bfseries 3} (2008) S08003,
  \url{http://stacks.iop.org/1748-0221/3/i=08/a=S08003}.

\bibitem{vandergraaf:2002}
H.~van~der Graaf and H.~Groenstege, {\em The Radiation Hardness of RASNIK
  Components for the ATLAS Muon Barrel Spectrometer}, tech. rep., 2002.
\newblock
  \url{http://doc.cern.ch//archive/electronic/cern/others/atlnot/Note/elec/ele%
c-2002-002.pdf}.

\end{thebibliography}\endgroup
