Construction and Test of MDT Precision Drift Chambers for the ATLAS Muon Spectrometer

F. Bauer, W. Blum, U. Bratzler, H. Dietl, S. Kotov, H. Kroha, A. Manz, Th. Lagouri, A. Ostapchuk, R. Richter, S. Schael

Max-Planck-Institut für Physik, Munich

S. Chouridou, M. Deile, O. Kortner, A. Staude, R. Stroehmer, T. Trefzger

Ludwig-Maximilian University, Munich

• Monitored Drift Tube Chambers (MDT) for the ATLAS Muon Spectrometer

• Construction of a full-sized prototype chamber

• Start of the large-scale chamber production

• Test results from the prototype and the first production chamber

H. Kroha, MPI für Physik, Munich IEEE NSS Symposium, 19/10/2000