% --------------------------------------------------------------------
% Aachen 99 Vortrag
% Author: H. Kroha
% --------------------------------------------------------------------
%FORMAT latex % use LATEXE format
\documentstyle[epsfig,rotating,colordvi,fancyheadings]{foils}
% ---------------------------------------------------------------------
\oddsidemargin  -17mm
\evensidemargin -17mm
\topmargin -32mm
%\headheight 12pt
%\headsep 25pt
%\footheight 12pt
%\footskip 75pt
\textheight 268mm
\textwidth 190mm

\font\tenrm=cmr10

%\psdraft

\begin{document}

\pagestyle{fancyplain}
 \headrulewidth 0pt
 \plainheadrulewidth 0pt
 \footrulewidth 1pt
 \plainfootrulewidth 1pt
\rhead[\fancyplain{}{}]{\fancyplain{}{}}
\lhead[\fancyplain{}{}]{\fancyplain{}{}}
\rfoot[\fancyplain{}{}]%
{\fancyplain{\tiny IEEE NSS Symposium, 19/10/2000}%
{\tiny IEEE NSS Symposium, 19/10/2000}}
\cfoot{}
\lfoot[\fancyplain{}{}]%
{\fancyplain{\tiny H.~Kroha, MPI f\"ur Physik, Munich}%
{\tiny H.~Kroha, MPI f\"ur Physik, Munich}}

\fboxrule=0.8mm
\fboxsep=3mm
\parindent=0.0em
\arrayrulewidth=0.8mm
\tabcolsep=2mm
\renewcommand{\arraystretch}{1.15}
%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Page14
%
\begin{figure}

\begin{center}
\Blue{\fbox{\Large\bf Laser Welding of Drift Tubes}}
\end{center}

\vspace{5mm}
\centerline{\Red{\large\bf Reliable ground contact to the aluminum tube}}
\vspace{5mm}

\begin{tabular}{ll}
\begin{minipage}{0.5\textwidth}
\Red{\bf via the aluminum ring}\hfill\break
\Red{\bf of the endplug:}\hfill
\vspace{3mm}

\mbox{\epsfig{figure=/.at/mdt_data/kroha/eps/endplug_laser.eps,angle=90,width=0.90\textwidth}}
\end{minipage} &
\begin{minipage}{0.5\textwidth}
\hspace{-10mm}
\mbox{\epsfig{figure=/.at/mdt_data/kroha/eps/weld_5083.eps,width=0.97\textwidth}}
\end{minipage} \\
\end{tabular}
\vspace{2mm}

\Blue{{\boldmath $\Longrightarrow$} {\bf Contact resistance}}
\Red{{\boldmath $<1$}~{\bf m}{\boldmath $\Omega$,}}

\Blue{\bf unchanged after accelerated salt spray corrosion test}

\begin{tabular}{ll}
\hspace{-4mm}
\mbox{\epsfig{figure=/.at/WWW/ftp/outgoing/mdt/Endplugs/Laserwelding/laser_setup_3.eps,
angle=-90,width=0.54\textwidth}} &

\fbox{\rule[-15mm]{0mm}{10mm}}
\hspace{-22mm}
\mbox{\epsfig{figure=/.at/WWW/ftp/outgoing/mdt/Endplugs/Endplug99/laserweld_color.eps,width=0.53\textwidth}} \\
\end{tabular}

\vspace{-200mm}

\end{figure}

\clearpage
%%%%%%%%%%%%%%%%%%%%%%%%%%%
\end{document}
