% --------------------------------------------------------------------
% Aachen 99 Vortrag
% Author: H. Kroha
% --------------------------------------------------------------------
%FORMAT latex % use LATEXE format
\documentstyle[epsfig,rotating,colordvi,fancyheadings]{foils}
% ---------------------------------------------------------------------
\oddsidemargin  -18mm
\evensidemargin -18mm
\topmargin -20mm
%\headheight 12pt
%\headsep 25pt
%\footheight 12pt
%\footskip 75pt
\textheight 260mm
\textwidth 180mm

\font\tenrm=cmr10

%\psdraft

\begin{document}

\pagestyle{fancyplain}
 \headrulewidth 0pt
 \plainheadrulewidth 0pt
 \footrulewidth 1pt
 \plainfootrulewidth 1pt
\rhead[\fancyplain{}{}]{\fancyplain{}{}}
\lhead[\fancyplain{}{}]{\fancyplain{}{}}
\rfoot[\fancyplain{}{}]%
{\fancyplain{\tiny IEEE NSS Symposium, 19/10/2000}%
{\tiny IEEE NSS Symposium, 19/10/2000}}
\cfoot{}
\lfoot[\fancyplain{}{}]%
{\fancyplain{\tiny H.~Kroha, MPI f\"ur Physik, Munich}%
{\tiny H.~Kroha, MPI f\"ur Physik, Munich}}

\fboxrule=0.8mm
\fboxsep=2mm
\parindent=0.0em
\arrayrulewidth=0.8mm
\tabcolsep=2mm
\renewcommand{\arraystretch}{1.15}
%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Page7
%
\begin{sidewaysfigure}

\begin{center}
\begin{Large}
\Blue{\fbox{\bf X-Ray Scan of the MDT Chambers at CERN}}
\end{Large}
\end{center}
\vspace{8mm}

\begin{tabular}{ll}
\hspace{-8mm}
\mbox{\epsfig{figure=/home/pcatlas17/kroha/eps/bos0_xtomo_7.eps,angle=-90,height=0.8\textwidth}} &

\mbox{\epsfig{figure=/.at/WWW/ftp/outgoing/mdt/Module0/assembly/xtomo/bos0_xtomo_38.eps,height=0.8\textwidth}}\\
\end{tabular}

\end{sidewaysfigure}

\clearpage
%%%%%%%%%%%%%%%%%%%%%%%%%%%
\end{document}
