% --------------------------------------------------------------------
% Aachen 99 Vortrag
% Author: H. Kroha
% --------------------------------------------------------------------
%FORMAT latex % use LATEXE format
\documentstyle[epsfig,rotating,colordvi,fancyheadings]{foils}
% ---------------------------------------------------------------------
\oddsidemargin  -15mm
\evensidemargin -15mm
\topmargin -32mm
%\headheight 12pt
%\headsep 25pt
%\footheight 12pt
%\footskip 75pt
\textheight 265mm
\textwidth 190mm

\font\tenrm=cmr10

%\psdraft

\begin{document}

\pagestyle{fancyplain}
 \headrulewidth 0pt
 \plainheadrulewidth 0pt
 \footrulewidth 1pt
 \plainfootrulewidth 1pt
\rhead[\fancyplain{}{}]{\fancyplain{}{}}
\lhead[\fancyplain{}{}]{\fancyplain{}{}}
\rfoot[\fancyplain{}{}]%
{\fancyplain{\tiny IEEE NSS Symposium, 19/10/2000}%
{\tiny IEEE NSS Symposium, 19/10/2000}}
\cfoot{}
\lfoot[\fancyplain{}{}]%
{\fancyplain{\tiny H.~Kroha, MPI f\"ur Physik, Munich}%
{\tiny H.~Kroha, MPI f\"ur Physik, Munich}}

\fboxrule=0.8mm
\fboxsep=3mm
\parindent=0.0em
\arrayrulewidth=0.8mm
\tabcolsep=2mm
\renewcommand{\arraystretch}{1.15}
%%%%%%%%%%%%%%%%%%%%%%%%%%%
\begin{sidewaysfigure}
\vspace{2mm}

\begin{center}
\begin{large}
\Blue{\bf Geometrical parameters of the MDT chambers from X-ray measurements (high voltage end)}
\end{large}
\vspace{8mm}

\begin{small}
\begin{tabular}{|l|c|c|c|c|}

\cline{2-5}
\multicolumn{1}{c}{\hfill} & \multicolumn{2}{|c}{\Blue{\bf BOS~1998 Chamber}} & \multicolumn{2}{|c|}{\Blue{\bf BOS~2000 Chamber}} \\
\cline{2-5}

\multicolumn{1}{c|}{\hfill}  & X-ray grid fit & Design value & X-ray grid fit & Design value \\
\hline

$y$-pitch $[\mu$m$]$        & \Blue{$\hphantom{.2}26058\pm 0.5\hphantom{01}$}  & \Red{$\hphantom{.2}26054\pm 5\hphantom{100.}$}  &
\Blue{$\hphantom{.2}26039\pm 0.5\hphantom{01}$}  & \Red{$\hphantom{.2}26039\pm 5\hphantom{100.}$} \\

$z$-pitch $[\mu$m$]$        & \Blue{$30036.2\pm 0.5\hphantom{01}$} & \Red{$\hphantom{.2}30036\pm 0.5\hphantom{01}$} &
\Blue{$30035.8\pm 0.5\hphantom{01}$} & \Red{$\hphantom{.2}30036\pm 0.5\hphantom{01}$} \\
\hline

$y$ sep.\ ML $[$mm$]$          & \Blue{$347.041\pm 0.011$} & \Red{$347.040\pm 0.010$} & \Blue{$346.878\pm 0.005$} & \Red{$346.882\pm 0.010$} \\
\hline

$z$-sep.\ ML $[\mu$m$]$        & \Blue{$\hphantom{347}-8\pm 11\hphantom{0.0}$} & \Red{$\hphantom{346.87}0\pm 10\hphantom{0.0}$} &
\Blue{$\hphantom{34}-22\pm 5\hphantom{0.01}$} & \Red{$\hphantom{346.87}0\pm 10\hphantom{0.0}$} \\
\hline

Rms~$y_{\mathrm Res}$ $[\mu$m$]$ & \multicolumn{2}{|c}{\Blue{$19.0$}}   & \multicolumn{2}{|c|}{\Blue{$14.3$}} \\

Rms~$z_{\mathrm Res}$ $[\mu$m$]$ & \multicolumn{2}{|c}{\Blue{$19.3$}}   & \multicolumn{2}{|c|}{\Blue{$10.5$}} \\
\hline

\end{tabular}
\end{small}

\vspace{5mm}
\mbox{\epsfig{figure=bos_cross.eps,angle=90,width=0.90\textheight}}

\end{center}
\end{sidewaysfigure}
\clearpage
%%%%%%%%%%%%%%%%%%%%%%%%%%%
\end{document}
