% --------------------------------------------------------------------
% IEEE 2000 Talk
% Author: H. Kroha
% --------------------------------------------------------------------
%FORMAT latex % use LATEXE format
\documentstyle[epsfig,rotating,colordvi,fancyheadings]{foils}
% ---------------------------------------------------------------------
\oddsidemargin  -17mm
\evensidemargin -17mm
\topmargin -25mm
%\headheight 12pt
%\headsep 25pt
%\footheight 12pt
%\footskip 75pt
\textheight 263mm
\textwidth 190mm

\font\tenrm=cmr10

%\psdraft

\begin{document}

\pagestyle{fancyplain}
 \headrulewidth 0pt
 \plainheadrulewidth 0pt
 \footrulewidth 1pt
 \plainfootrulewidth 1pt
\rhead[\fancyplain{}{}]{\fancyplain{}{}}
\lhead[\fancyplain{}{}]{\fancyplain{}{}}
\rfoot[\fancyplain{}{}]%
{\fancyplain{\tiny IEEE NSS Symposium, 19/10/2000}%
{\tiny IEEE NSS Symposium, 19/10/2000}}
\cfoot{}
\lfoot[\fancyplain{}{}]%
{\fancyplain{\tiny H.~Kroha, MPI f\"ur Physik, Munich}%
{\tiny H.~Kroha, MPI f\"ur Physik, Munich}}

\fboxrule=0.8mm
\fboxsep=3mm
\parindent=0.0em
\arrayrulewidth=0.8mm
\tabcolsep=2mm
\renewcommand{\arraystretch}{1.15}
%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Page14
%
\begin{figure}

\begin{center}
\Blue{\fbox{\Large\bf Prototype Test Beam Results}}
\end{center}
\vspace{5mm}

\begin{itemize}

\item \Red{{\bf Single-tube space--drift time relation can be
used over the whole beam area} {\boldmath $(1\times 1$}~{\bf m}{\boldmath ${}^2).$}}

{\bf Allow only max.\ drift time to vary within 6~ns (rms)}\hfill\break
{\bf (due to varying operating conditions of drift tubes).}

\item {\bf Require track residual distributions as function of drift distance
to be symmetric left and right of the wires}

\Blue{{\boldmath $\Rightarrow$} {\bf Measure wire displacements} {\boldmath $\perp$}
{\bf beam with accuracy}\hfill\break
{\boldmath $\hphantom{\Rightarrow}$} {\bf of}} \Red{{\boldmath $10~\mu$}{\bf m (rms)}}
\Blue{\bf with respect to a reference wire.}

\vspace{3mm}

{\bf Good correlation with wire positions from X-ray scan of the chamber:}

\end{itemize}

\begin{tabular}{ll}
\begin{minipage}{0.5\textwidth}
\hspace{-4mm}
\mbox{\epsfig{figure=/.at/WWW/ftp/outgoing/mdt/BOS-3800/bos98_tb_wirepos.eps,
width=1.15\textwidth}}\hfill
\end{minipage} &
\begin{minipage}{0.5\textwidth}
\hspace{-10mm}
\mbox{\epsfig{figure=/.at/WWW/ftp/outgoing/mdt/BOS-3800/bos98_tb_delwp.eps,
width=1.1\textwidth}}\hfill
\end{minipage} \\
\end{tabular}

\vspace{-200mm}

\end{figure}

\clearpage
%%%%%%%%%%%%%%%%%%%%%%%%%%%
\end{document}
