% --------------------------------------------------------------------
% Site Review 24 July 2000
% Author: H. Kroha
% --------------------------------------------------------------------
%FORMAT latex % use LATEXE format
\documentstyle[epsfig,rotating,colordvi,fancyheadings]{foils}
% ---------------------------------------------------------------------
\oddsidemargin  -17mm
\evensidemargin -17mm
\topmargin -31mm
%\headheight 12pt
%\headsep 25pt
%\footheight 12pt
%\footskip 75pt
\textheight 267mm
\textwidth 190mm

\font\tenrm=cmr10

%\psdraft

\begin{document}

\pagestyle{fancyplain}
 \headrulewidth 0pt
 \plainheadrulewidth 0pt
 \footrulewidth 2pt
 \plainfootrulewidth 2pt
\rhead[\fancyplain{}{}]{\fancyplain{}{}}
\lhead[\fancyplain{}{}]{\fancyplain{}{}}
\rfoot[\fancyplain{}{}]%
{\fancyplain{\tiny IEEE NSS Symposium, 19/10/2000}%
{\tiny IEEE NSS Symposium, 19/10/2000}}
\cfoot{}
\lfoot[\fancyplain{}{}]%
{\fancyplain{\tiny \hspace{5mm}H.~Kroha, MPI f\"ur Physik, Munich}%
{\tiny \hspace{5mm}H.~Kroha, MPI f\"ur Physik, Munich}}

\fboxrule=0.8mm
\fboxsep=3mm
\parindent=0.0em

\renewcommand{\arraystretch}{1.10}
%%%%%%%%%%%%%%%%%%%%%%%%%%%
\begin{figure}

\begin{Large}
\Blue{\fbox{\bf Automated Drift Tube Wiring Station}}
\end{Large}

\begin{normalsize}
$\bullet$ \Red{\bf Developed by CERN/INFN Frascati/NIKHEF.}\hfill\break
$\bullet$ \Red{\bf Operated in climatized clean room at JINR Dubna.}\hfill\break
$\bullet$ \Red{\bf Collaboration Munich--Dubna.}\hfill
\end{normalsize}
\vspace{-6mm}

\begin{center}
\mbox{\epsfig{figure=/.at/mdt_data/kroha/eps/dubna_wiring_5.eps,width=0.85\textwidth}}

\mbox{\epsfig{figure=/.at/WWW/ftp/outgoing/qaqc/dubna/dubna_siterev_3.eps,
width=0.85\textwidth}}
\end{center}

\vspace{-200mm}

\end{figure}

\clearpage
%%%%%%%%%%%%%%%%%%%%%%%%%%%
\end{document}
