Chamber Serial Production

• Start of chamber production at MPI: December 2000. • 15 of 88 chambers have been constructed. • The assembly of the largest barrel MDT chambers of 2 m width is the most delicate for routine operation (gravitational sag compensation).

• The originally foreseen production rate of 1 chamber/8 working days has been reached.

• Preparations to speed up to 1 chamber/6 working days (space frame assembly).

• Remaining production time: 2^1_2 years.

H. Kroha, MPI für Physik, Munich 17 IEEE NSS Symposium, 7 November, 2001