% --------------------------------------------------------------------
% Aachen 99 Vortrag
% Author: H. Kroha
% --------------------------------------------------------------------
%FORMAT latex % use LATEXE format
\documentstyle[epsfig,rotating,colordvi,fancyheadings]{foils}
% ---------------------------------------------------------------------
\oddsidemargin  -17mm
\evensidemargin -17mm
\topmargin -24mm
%\headheight 12pt
%\headsep 25pt
%\footheight 12pt
%\footskip 75pt
\textheight 261mm
\textwidth 190mm

\font\tenrm=cmr10

%\psdraft
\setcounter{page}{18}

\begin{document}

\pagestyle{fancyplain}
 \headrulewidth 0pt
 \plainheadrulewidth 0pt
 \footrulewidth 1pt
 \plainfootrulewidth 1pt
\rhead[\fancyplain{}{}]{\fancyplain{}{}}
\lhead[\fancyplain{}{}]{\fancyplain{}{}}
\rfoot[\fancyplain{}{}]%
{\fancyplain{\tiny IEEE NSS Symposium, 7 November, 2001}%
{\tiny IEEE NSS Symposium, 7 November, 2001}}
\cfoot{\tiny\thepage}
\lfoot[\fancyplain{}{}]%
{\fancyplain{\tiny H.~Kroha, MPI f\"ur Physik, Munich}%
{\tiny H.~Kroha, MPI f\"ur Physik, Munich}}

\fboxrule=0.8mm
\fboxsep=3mm
\parindent=0.0em
\arrayrulewidth=0.8mm
\tabcolsep=2mm
\renewcommand{\arraystretch}{1.15}
%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Page14
%
\begin{sidewaysfigure}

\begin{tabular}{ll}
\begin{minipage}{0.55\textheight}

\begin{center}
\Blue{\fbox{\Large\bf Chamber Test Program}}
\end{center}

\begin{enumerate}
\addtolength{\itemindent}{-3mm}

{\bf
\item {\bf Required chamber leak rate at 3 bar}\hfill\break
\centerline{
\Red{{\boldmath $< 2\times \#$}{\bf tubes}~{\boldmath $\times$}~{\bf tube leak rate limit}}}
{\bf is challenging but feasible.}
\vspace{-7mm}

\item {\bf HV stability test of complete chamber under varying humidity conditions.}
\vspace{-7mm}

\item {\bf Operation test of each chamber in cosmic ray tower of at least 3 chambers.}
}
\end{enumerate}
\vspace{-10mm}

\begin{center}
\mbox{\epsfig{figure=/.at/wwwatlas/ftp/outgoing/mdt/cosmic-ray-stand/bos2a08_lmu.eps,
width=0.52\textheight}}
\end{center}
\end{minipage}  &

\begin{minipage}{0.45\textheight}
\vspace{30mm}
\begin{center}
\mbox{\epsfig{figure=/home/iwsatlas1/kroha/tex/qaqc/teststand_lmu.ps,
angle=180,width=0.45\textheight}}
\end{center}
\end{minipage}  \\
\end{tabular}

\end{sidewaysfigure}

\clearpage
%%%%%%%%%%%%%%%%%%%%%%%%%%%
\end{document}
