Testbeam 2001 at CERN

• First beam test of MDT chambers from serial production (200 GeV muons).

• With prototype readout electronics and DAQ system for ATLAS.

• Comparison with 1999 testbeam data with BOS MDT prototype chamber.

H. Kroha, MPI für Physik, Munich 19 IEEE NSS Symposium, 7 November, 2001