% --------------------------------------------------------------------
% Site Review 24 July 2000
% Author: H. Kroha
% --------------------------------------------------------------------
%FORMAT latex % use LATEXE format
\documentstyle[epsfig,rotating,colordvi,fancyheadings]{foils}
% ---------------------------------------------------------------------
\oddsidemargin  -17mm
\evensidemargin -17mm
\topmargin -20mm
%\headheight 12pt
%\headsep 25pt
%\footheight 12pt
%\footskip 75pt
\textheight 255mm
\textwidth 190mm

\font\tenrm=cmr10

%\psdraft
\setcounter{page}{9}

\begin{document}

\pagestyle{fancyplain}
 \headrulewidth 0pt
 \plainheadrulewidth 0pt
 \footrulewidth 2pt
 \plainfootrulewidth 2pt
\rhead[\fancyplain{}{}]{\fancyplain{}{}}
\lhead[\fancyplain{}{}]{\fancyplain{}{}}
\rfoot[\fancyplain{}{}]%
{\fancyplain{\tiny IEEE NSS Symposium, 7 November, 2001}%
{\tiny IEEE NSS Symposium, 7 November, 2001}}
\cfoot{\tiny\thepage}
\lfoot[\fancyplain{}{}]%
{\fancyplain{\tiny H.~Kroha, MPI f\"ur Physik, Munich}%
{\tiny H.~Kroha, MPI f\"ur Physik, Munich}}

\fboxrule=0.8mm
\fboxsep=3mm
\parindent=0.0em

\renewcommand{\arraystretch}{1.10}
%%%%%%%%%%%%%%%%%%%%%%%%%%%
\begin{sidewaysfigure}

\begin{center}
\Blue{\Large\bf X-Ray Measurement of Wire Coordinates}
\end{center}
\vspace{3mm}

\begin{tabular}{ll}

\begin{minipage}{0.5\textheight}
\mbox{\epsfig{figure=/.at/wwwatlas/ftp/outgoing/mdt/tubes/X_Ray_Test/X_principles.eps,
width=0.40\textheight}}
\mbox{\epsfig{figure=/.at/wwwatlas/ftp/outgoing/mdt/tubes/X_Ray_Test/X_ray_tubes_1.eps,
width=0.40\textheight}}
\end{minipage} &

\begin{minipage}{0.5\textheight}

\vspace{-85mm}
\mbox{\hspace{-18mm}\epsfig{figure=/.at/wwwatlas/ftp/outgoing/mdt/tubes/X_Ray_Test/X_wires.eps,
width=0.45\textheight}}
\mbox{\hspace{-30mm}\epsfig{figure=/.at/wwwatlas/ftp/outgoing/mdt/tubes/Dubna_wirepos_b_2.eps,
bbllx=25mm,bblly=190mm,
width=0.45\textheight}}
\end{minipage} \\

\end{tabular}


\end{sidewaysfigure}

\clearpage
%%%%%%%%%%%%%%%%%%%%%%%%%%%
\end{document}
